-60 -40 -20 0 20 40 60 80

B

A_{DP}

Time (s)

Sticking coefficient CHD_3 Partial Pressure (arb. units)

Time (s)

P

-4 -2 0 2 4 6 8 10 12 14 16 18

0.00

0.02

0.04

0.06

0.08

0.10

0.12 Expt Fit