Sticking probability as a function of the average incidence energy obtained from MD and MDEF calculations. Black symbols show the MD, red and purple symbols show results of MDEF calculations using friction coefficient multiplied by different factors (× 1 and × 2 respectively) and green symbols show MDEF results using an electronic temperature Tel = 300 K.