Comparison of the experimental data from Hodgson et al. [16 in paper], with the theoretical results (a) obtained with the SBC parameters of Cao et al. [17 in paper], (b) and with the PNA parameters [44 inpaper]. In all cases the horizontal arrows and the numbers indicate the energy spacings between the interpol- ated values of the theoretical results and the actual experimental values. The blue lines show the interpolated curves of the computed data.