Computed sticking probabilities (blue symbols) are shown as a function of <Ei> along with the experimental results (red symbols) of Luntz et al. [ref 15 in papre]. The arrows and accompanying numbers show the energy differences between the experimental data and the interpolated theoretical sticking probability values.