Comparison of the energy dependence of the sticking probability of D2 on Pt(111) for three different sets of experimental data from Hodg- son and co-workers [16] (red circles), Luntz et al. [15 in paper] (black circles for a surface temperature Ts of 293 K, green circles for Ts ≈ 150 K), and Cao et al. [17 in paper] (blue circles). Nozzle temperatures Tn are indicated (in K) for the experiments of Hodgson and co-workers and of Cao et al..
