(a) The coordinate system used to describe the H2 molecule relative to the static Ag(111) surface. (b) Top view of the surface unit cell and the sites considered for the Ag(111) surface. The center of mass (of H2) coordinate system is centered on a top site (a surface atom). The hcp site corresponds to a second layer atom and the fcc site to a third layer atom.
