VASP single points for H2 on Pt(111), H2 is parallel to the surface,   Top         Z = 2.1,  R = 0.75, phi = 0
                                                                                                         Bridge     Z = 1.8,  R = 0.85, phi = 0
                                                                                                         hcp         Z = 1.5,  R = 0.85, phi = 30
                                                                                                         t2h         Z = 1.5,  R = 0.85, phi = 120
